== OpenID Connect Standards Compliance


=== Standards Non-Compliance

ChibiAuth chooses to be non-compatible with various sections.

* In *Section 5.1*, the `gender` standard claim specifies that the strings "male" and "female" must be accepted with accepting other genders being optional.
ChibiAuth gives doesn't recognize this bias and accepts empty and arbitrary limited strings with no special treatment to any cultural bias.
The field is limited in characters to prevent maliciously filling the database. If 256 characters aren't enough please do let me know.
Plus I am not very convinces that filling the database via malicously large fields is a relevant issue.
